DEFINITION MODULE CommandLineInterface;

FROM Common IMPORT ShortString;

TYPE
  CommandLine = RECORD
    input: ShortString;
    output: ShortString;
    lex: BOOLEAN;
    parse: BOOLEAN
  END;
  PCommandLine = POINTER TO CommandLine;

PROCEDURE parse_command_line(): PCommandLine;

END CommandLineInterface.
